Title: Is iron a permanent magnet?
Course: THE MIST€RY OF ELECTRICITY.I > Section: 1. ELECTRIST€RY - MISTERY.I

- Yes, most of the magnets are made from iron.
- No, only for one more hour.
- No, when the current stops flowing through the copper wire, the iron screw stops its magnet properties.