Title: OCEAN AND MARINE ENERGY IN EUROPE
Course: ELECTRICITY AS DOMESTIC USE.

This last point is the bridge for the following scenario ELECTRIST€RY.III, in which you learn in more detail THE ENERGY POWER OF OUR SEA AND OCEAN.

WindFloat: a semisubmersible floating 2 MW offshore wind turbine installation offshore Aguçadoura, Portugal. (Source: A semi-submersible type floating offshore wind turbine foundation called the WindFloat operating at rated capacity (2 MW) approximately 5 km offshore of Agucadoura, Portugal by Untrakdrover, retrieved from https://en.wikipedia.org/wiki/File:Agucadoura_WindFloat_Prototype.jpg. Used under Creative Commons Attribution-Share Alike 3.0 Unported license).