Title: Quiz 2

True/False Question

Q: We can hear frequencies from 20Hz to 20.000Hz.
A: true

True/False Question

Q: Infrasound is the band of frequencies below 20Hz.
A: true

True/False Question

Q: Animals can hear ultrasounds (frequencies above 20000 Hz).
A: true